Conclusion

• CMS can contribute significantly to the measurement of the CP violation parameter sin2β.

Expected precision: δ(sin2β) ≈ 0.02 for 10^4pb�^1

• The asymmetry in the decay B^0_s → J/ΨΦ could be tested to the ≈ 2 − 5 % level depending on x_s for 10^4pb�^1

3-7-1998 Jacqueline Stefanescu