Β^0_d5ΨΚ^0_s5μ^+μ^-π^+π^-

0 100 200 300 400 500 600 700 800 900

3 3.2

Ψ mass (GeV)

σ_{μμ = 23 MeV}

Averaged over |η| Ω 2.4

0 100 200 300 400 500 600

0.4 0.5 0.6

Κ^0_s mass (GeV)

σ_{ππ = 5 MeV}

Mass resolution

0

100

200

300

400

500

5 5.2 5.4 5.6

Β^0_d mass (GeV)

σ_{μμππ = 21 MeV}

without K^0_s and Ψ mass constraints 5 σ_{μμππ = 33 MeV}

4 with mass constraints 4 p_t^π Ο 0.7GeV 4 L_K^0_s Ο 1cm 4 |m_K^0_s-m_{ππ}| Ω 3σ_K^0_s 4 |m_Ψ-m_{μμ}| Ω 2σ_Ψ