0 100 200 300 400 500 600

0.4 0.45 0.5 0.55 0.6 M(π^+π^-) (GeV)

Events/ 2 MeV

Κ^0_s5 π π

4 p_t^π Ο 0.7 GeV 4 L_K^0_s Ο 1cm

S/B=3.5

Signal/bkgd in bb^_ 5 Ψ X 5 μ μ x events

0 20 40 60 80 100 120

4.8 5 5.2 5.4 5.6 5.8 M(μ^+μ^-π^+π^-) (GeV)

Events/ 20 MeV

Β^0_d5 Ψ Κ^0_s5 μ μ π π

4 p_t^π Ο 0.7 GeV 4 L_K^0_s Ο 1cm 4 |m_K^0_s-m_{ππ}| Ω 3σ_K^0_s

S/B=8