Recent heavy meson results from CLEO

Mark Dickson

Cornell University CLEO Collaboration

June 22, 1998

Abstract

Analysis of the 5 fb�^1 CLEO II data-set is still yielding many interesting results, and by the end of 1998 an additional 8 fb�^1 will have been collected by the CLEO II.5 detector; it doesn’t end there either. The CLEO III detector, currently under construction, will be installed early next year in conjunction with an upgrade to the accelerator, assuring an exciting future for heavy quark physics at CLEO. Recent results from the study of rare, semileptonic and hadronic B decays will be presented, as well as measurements of charm meson properties. The future plans for the CLEO detector will also be briefly described.