CMS detector and its B–physics potential

Ritva Kinnunen Helsinki Institute of Physics CMS Collaboration May 19, 1998 Abstract The main features of the CMS detector are described. The B{physics potential of the detector is discussed and expectations for rare decay modes and B^0_s oscillations are shown.