INFN Genova

Experiment:

Istituto Nazionale Fisica Nucleare

Via Dodecaneso 33

I-16146 Genova

DESIGNED BY:

DATE DESIGNED:

TITLE:

NOTES:

REV:

DATE:

050100150200

050100150050100150

200150100050SHEET OF

R11270VTT

C3100nF

TB1TB2C1100nF

C2100nF

R4310C8100nF VEE R4410C7100nF

R4510C6100nF

C11100nF VCC C10100nF

C9100nF

Dout(0)

Dout(1)

Dout(2)

Dout(3)

Dout(4)

Dout(5)

Dout(6)

Dout(7)

Dout(8)

Dout(9)

Dout(10)

Dout(11)

Dout(12)

Dout(13)

Dout(14)

Dout(15)

TP17

TP11

TP10

120R1120R2VTT

U8HDMP_1014

HDMP_1014 (Rx)

D01D02D03D04D05D06D07D08D09D10D11D12D13D14D15D16D17D18D19D001234CAP1B

CAP1A

CAP0B

CAP0A

46474849505154555657585960656667686970713637383940452627282930793234192025141567525372STAT1

STAT0

PH1FDIS

ACTIVE

SMRST1

SMRST0

FLAGSEL

M20SEL

DIV1

DIV0

EQEN

ECLGND3

ECLGND2

ECLGND1

ECLGND0

DINDINFLAG

FFCAV DAV ERROR

LINKRDY

171816LOOPEN

LINLIN1110TCLK

TCLK

TCLKSEL

76NCLK

BCLK

8BCLK

9FCLK

75STRBOUT

3577OTEMP

125161514131211109212223241234820U2F100328D

TTLECL

LEOEDIRE0E1E2E3E4E5E6E7T0T1T2T3T4T5T6T7(0=In/ECL)

(1=In/TTL)

5161514131211109212223241234820U4F100328D

U6MC100EL01D

123467U7MC100EL31D

QCLK

RSD412376R3100VTT

U3MC100E143FN

34567910111213151718192122232425262728Q0Q1Q2Q3Q4Q5Q6Q7Q8D0D1D2D3D4D5D6D7D8CLK1

CLK2

SELMRU5MC100E143FN

SELMRR27100VTT

R_ECL(0)

R_ECL(1)

R_ECL(2)

R_ECL(3)

R_ECL(4)

R_ECL(5)

R_ECL(6)

R_ECL(7)

R_ECL(8)

R_ECL(9)

R_ECL(10)

R_ECL(11)

R_ECL(12)

R_ECL(13)

R_ECL(14)

R_ECL(15)

DoutECL(0)

DoutECL(1)

DoutECL(2)

DoutECL(3)

DoutECL(4)

DoutECL(5)

DoutECL(6)

DoutECL(7)

DoutECL(8)

DoutECL(9)

DoutECL(10)

DoutECL(11)

DoutECL(12)

DoutECL(13)

DoutECL(14)

DoutECL(15)

CK_RX(2)

CK_RX(1)

CK_RX(0)

C12100nF

C13100nF

C14100nF

C15100nF

C16100nF

L116.8uH

L216.8uH

R4100R6100R5100R28100R29100R30100R31100R32100R33100R34100R35100R36100R37100R38100R39100R40100R41100R42100R10270U174FCT162244

148474644434140383736353332302927262524232220191716141312119865324A44A34A24A13A43A33A23A12A42A32A22A11A41A31A21A11Y41Y31Y21Y14OE3OE2OE1OE4Y44Y34Y24Y13Y43Y33Y23Y12Y42Y32Y22Y1C17100nF

D1BAT43

TP4TP6TP3TP5TP9TP12

TP13

TP14

TP15

TP16

TP2TP1TP8TP7R12270R13270R14270R15270R17270R18270R19270R20270R21270R22270R23270R24270R25270R26270R16270U9FTR8510_RTX

5VDC2

5VDC1

19SYS-STATUS

272628232225242120184Gnd4

Gnd3

Gnd2

Gnd1

5V_STDBY

OPT_PWR

SIG_DET

RXRXVCC_TX_RX

C4100nF

C5100nF

R7100R8100R46100

CK_RX(2)

CK_RX(1)

CK_RX(0)

IFR - G_Link RX

Drawing S.N.

SD 350-730-05-C01

11/25/1997

012GLINK DATA RECEIVER

RX ERROR FLAGS

TO TX

FROM TX

TOCONNECTOR

FROM

CONNECTOR

CLOCK

TOCLOCKDC DECOUPLING CAPACITOR

TO uC

TO uC25 Nov. 1997

SAVERIO MINUTOLI

BaBar

6RX_STAT1

RX_STAT0

ECL_RST

LOCKED

LKRDY

DAVDout(15:0)

DoutECL(15:0)

R_ECL(15:0)

ECL_HIGH

CK_RX(2:0)

STRBOUT

SYS_STS