INFN Genova

Experiment:

Istituto Nazionale Fisica Nucleare

Via Dodecaneso 33

I-16146 Genova

DESIGNED BY:

DATE DESIGNED:

TITLE:

NOTES:

REV:

DATE:

050100150200

050100150050100150

200150100050SHEET OF

U40HDMP_1012

D01D02D03D04D05D06D07D08D09D10D11D12D13D14D15D16D17D18D19D00893467686970CAV

EDSTRBIN

STRBIN

RSTFF5958575554535047494851464540395638373635601234101112141516171819202565717374757678CAP1B

CAP1A

CAP0B

CAP0A

LOOPEN

FLAGSEL

M20SEL

MDFSEL

DIV1

DIV0

EHCLKSEL

HCLK

LOUT

DOUT

INVRFD

STRBOUT

LOCKED

FLAG DAV HCLKON

336677ECLGND2

ECLGND1

ECLGND0 VTT DinECL(0)

DinECL(1)

DinECL(2)

DinECL(3)

DinECL(4)

DinECL(5)

DinECL(6)

DinECL(7)

DinECL(8)

DinECL(9)

DinECL(10)

DinECL(11)

DinECL(12)

DinECL(13)

DinECL(14)

DinECL(15)

C31100nF

R87150R86150C34100nF

TB3TB4Y3LEMO00

C18100nF

R80270R8110C26100nF VEE R8210C27100nF

R8310C28100nF VCC R910KVCC

U112091011121314151643212423222158F100328D

TTLECL

LEOEDIRE0E1E2E3E4E5E6E7T0T1T2T3T4T5T6T7(0=In/ECL)

(1=In/TTL)

U132091011121314151643212423222158F100328D

U12MC100E143FN

34567910111213151718192122232425262728Q0Q1Q2Q3Q4Q5Q6Q7Q8D0D1D2D3D4D5D6D7D8CLK1

CLK2

SELMRU14MC100E143FN

SELMRR64100VTT

Din_E(0)

Din_E(1)

Din_E(2)

Din_E(3)

Din_E(4)

Din_E(5)

Din_E(6)

Din_E(7)

Din_E(8)

Din_E(9)

Din_E(10)

Din_E(11)

Din_E(12)

Din_E(13)

Din_E(14)

Din_E(15)

R85100C20100nF

C21100nF

C24100nF

C25100nF

L36.8uH

R49100C33100nF

C32100nF

R84100VTT

R50100R51100R52100R53100R54100R55100R56100R57100R58100R59100R60100R61100R62100R143

100R63100R65100R66100R67100R68100R69100R70100R71100R72100R73100R74100R75100R76100R77100R78100R79100Din(0)

Din(1)

Din(2)

Din(3)

Din(4)

Din(5)

Din(6)

Din(7)

Din(8)

Din(9)

Din(10)

Din(11)

Din(12)

Din(13)

Din(14)

Din(15)

R48100R47100VTT

C23100nF

C22100nF

C19100nF

D7BAT43

TP20

TP19

TP18

TP21

TP22

TP23

U9FTR8510_RTX

5VDC2

5VDC1

65Gnd2

Gnd1

910Gnd4

Gnd3

171615141312RESET

11TX87CS312READY

SCLK

SISOOFC_STATUS

TX_OFF

TXVCC_TX_RX

C29100nF

C30100nF

R161

10KR163

10KR162

10KU1074FCT162244

148474644434140383736353332302927262524232220191716141312119865324A44A34A24A13A43A33A23A12A42A32A22A11A41A31A21A11Y41Y31Y21Y14OE3OE2OE1OE4Y44Y34Y24Y13Y43Y33Y23Y12Y42Y32Y22Y1FROM CLOCK

DC DECOUPLING CAPACITOR

STROBEOUT MONITOR

GLINK DATA TRANSMITTER

FROM

CONNECTOR

FROM CLOCK

FROM RX

TO RX

SERVICE

TO uP

FROM uP

TO - uP

25 Nov. 1997

SAVERIO MINUTOLI

BaBar

63IFR - G_Link TX

11/25/1997

01Drawing S.N.

SD 350-730-05-C01

ECL_HIGH

DinECL(15:0)

Din(15:0)

RX_STAT0

ECL_RST

RFD_ECL

TX_STRBOUT

STRB_MON

RX_STAT1

TTL_RST

SOCSREADY

Din_E(15:0)

CLK_TX

Din_T(15)

Din_T(14)

Din_T(13)

Din_T(12)

Din_T(11)

Din_T(10)

Din_T(9)

Din_T(8)

Din_T(7)

Din_T(6)

Din_T(5)

Din_T(4)

Din_T(3)

Din_T(2)

Din_T(1)

Din_T(0)

CK1_R_ECL

CK0_R_ECL

SISCLK