SHEET OF

050100150200

150100050150100050

200150100050DATE:

REV:

NOTES:

TITLE:

DATE DESIGNED:

DESIGNED BY:

Istituto Nazionale Fisica Nucleare

Via Dodecaneso 33

I-16146 Genova

Experiment:

INFN Genova

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

C21100nF

C23100nF

C22100nF

C24100nF

C25100nF

C27100nF

C26100nF

C28100nF

C30100nF

C32100nF

C33100nF

C35100nF

C34100nF

C36100nF

C37100nF

C39100nF

C38100nF

C40100nF

C41100nF

C43100nF

C42100nF

C44100nF

C31100nF

C29VEEVDDGNDGNDGND6291113151719212325272931531748101214161820222426283032J8A32A31A30A29A28A27A26A25A24A23A22A21A20A19A18A17A16A15A14A13A12A11A10A9A8A7A6A5A4A3A2A1J66461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ73534414248495556626344464539373851535258605933364043475054576164B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ93534414248495556626344464539373851535258605933364043475054576164B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ106461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ113534414248495556626344464539373851535258605933364043475054576164B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ83534414248495556626344464539373851535258605933364043475054576164B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCC10 Oct. 1997

Drawing S.N.

SD 350-730-06-C01

10/10/1997

01IFR DETECTOR POINT TO POINT DISTRIBUTION BOARD

SAVERIO MINUTOLI

BaBar

25Din1Din2Din3Din4Din5Din6Dout6

CLK6

Dout5

CLK5

Dout4

CLK4

CLK1

Dout1

CLK2

Dout2

CLK3

Dout3/tmp_mnt/net/dsyge2/files1/job/babar_17/cae/babar_plane.sbk(02;21) Wed Dec 10 19:07:09 1997