SHEET OF

050100150200

150100050150100050

200150100050DATE:

REV:

NOTES:

TITLE:

DATE DESIGNED:

DESIGNED BY:

Istituto Nazionale Fisica Nucleare

Via Dodecaneso 33

I-16146 Genova

Experiment:

INFN Genova

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

C69100nF

C71100nF

C70100nF

C72100nF

C73100nF

C75100nF

C74100nF

C76100nF

C77100nF

C79100nF

C78100nF

C80100nF

C81100nF

C83100nF

C82100nF

C84J186461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ196461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ206461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCCJ216461575450474340363359605852535138373945464463625655494842413435B32B31B30B29B28B27B26B25B24B23B22B21B20B19B18B17B16B15B14B13B12B11B10B9B8B7B6B5B4B3B2B1GNDGNDGNDGNDGNDVDDVEEVTTVCC10 Oct. 1997

Drawing S.N.

SD 350-730-06-C01

10/10/1997

01IFR DETECTOR POINT TO POINT DISTRIBUTION BOARD

SAVERIO MINUTOLI

BaBar

45Din13

Din14

Din15

Din16

Dout16

CLK16

Dout15

CLK15

Dout14

CLK14

Dout13

CLK13

/tmp_mnt/net/dsyge2/files1/job/babar_17/cae/babar_plane.sbk(04;44) Wed Dec 10 19:05:51 1997