DELPHI proc. 98D2 - correl. mass cut

-100 -80 -60 -40 -20 0 20 40 60 80 100

0 50 100 150 200 Mjet+Mee

Mjet-Mee

-100 -80 -60 -40 -20 0 20 40 60 80 100

0 50 100 150 200 Mjet+Mee

Mjet-Mee

-100 -80 -60 -40 -20 0 20 40 60 80 100

0 50 100 150 200 Mjet+Mee

Mjet-Mee

-100 -80 -60 -40 -20 0 20 40 60 80 100

0 50 100 150 200 q qbar WWEX e+e-qqbar

Mjet+Mee

Mjet-Mee