MASS

Hee at 189 GeV

0

50

100

150

200

250

300

60 70 80 90 100 110 120 130 140

MASS

0 2.5 5 7.5 10 12.5 15 17.5 20

60 70 80 90 100 110 120 130 140 150

Hee at 189 GeV

-5

-4

-3

-2

-1

0

1

2

3

4

5

0 20 40 60 80 100 120 140 160 glob btag vs 5C fit jet mass - Mh=90 GeV

Higgs m=90 GeV Background Real data