Hee MC(including MadMen) -data comparison /Ldt=193 pb^{-1}

Number of events per bin

0 100 200 300 400

0 20 40 60 80 100

MC qq^–(γ) 4-fermion

0 0.05 0.1 0.15

0 20 40 60 80 100

DELPHI

Slow electron energy (GeV)

0 25 50 75 100

0 20 40 60 80 100 0 0.05 0.1 0.15

0 20 40 60 80 100 Fast electron energy (GeV)

0 20 40 60 80

50 100 150 0 0.1 0.2 0.3 0.4

50 100 150 Fitted mass of the jet system (GeV/c^2)

1 10 10^2

0 50 100 150

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 50 100 150 Electron candidate maximum isolation angle (degrees)