DELPHI - Ρs = 183 GeV

30

40

50

60

0 0.2 0.4 0.6 0.8 1 1.2

0

0.5

1

1.5

2

0 0.2 0.4 0.6 0.8 1 1.2

30

40

50

60

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2